\documentstyle[psfig,twocolumn]{article}
\textwidth=7.0in
\textheight=9.5in
\evensidemargin=-0.27in
\oddsidemargin=-0.27in
\topmargin=-0.25in
\topskip=0pt
\columnsep=0.25in
\baselineskip=14pt
\begin{document}
\parskip=12pt
\parindent=0pt
\bibliographystyle{plain}
\input qlen
\end{document}

